VSQuerycount/vsqfnelt

                                                                    June 26, 1998 2-219

H DF Reference Manual

                                                   VSQuerycount/vsqfnelt

                                                   intn VSQuerycount(int32 vdata_id , int32 * n_records )

                                                                    vdata_id IN: Vdata access identifier returned by VSattach

                                                                    n_records OUT: Number of records in the vdata

                                                                    Pu rpose Retrieves the number of records in a vdata.

                                                                    Retu rn value Returns
SUCCEED

 (or
0

) if successful and
FAIL

 (or
-1

) otherwise.

                                                                    Description VS Querycount  retrieves the number of records in the vdata identified by

                                                                                                                        vdata_id  in the parameter n_records .

                                                                    FORTRAN integer function vsqfnelt(vdata_id, n_records)

                                                                                                                        integer vdata_id, n_records

 VSQueryfields/vsqfflds

National Center for Supercomputing Applications

2-220 June 26, 1998

                                                  VSQueryfields/vsqfflds

                                                  intn VSQueryfields(int32 vdata_id , char * field_name_list )

                                                                  vdata_id IN: Vdata access identifier returned by VSattach

                                                                  field_nam e_list OUT: List of field names

                                                                  Pu rpose Retrieves the names of the fields in a vdata.

                                                                  Retu rn value Returns
SUCCEED

 (or
0

) if successful and
FAIL

 (or
-1

) otherwise.

                                                                  Description VS Queryfield s  retrieves the names of the fields in the vdata identified by the

                                                                                                                       parameter vdata_id  into the parameter field_name_list .

                                                                                                                       The parameter field_name_list  is a comma-separated list of the fields in the

                                                                                                                       vdata. (i.e., ^P X,PY,PZ~ in C and ´PX,PY,PZ´ in Fortran).

                                                                  FORTRAN integer function vsqfflds(vdata_id, field_name_list)

                                                                                                                       integer vdata_id

                                                                                                                       character*(*) field_name_list

VSQueryinterlace/vsqfintr

                                                                    June 26, 1998 2-221

H DF Reference Manual

                                                   VSQueryinterlace/vsqfintr

                                                   intn VSQueryinterlace(int32 vdata_id , int32 * interlace_mode )

                                                                    vdata_id IN: Vdata identifier returned by VSattach

                                                                    interlace_mode OUT: Interlace mode

                                                                    Pu rpose Retrieves the interlace mode of the vdata.

                                                                    Retu rn value Returns
SUCCEED

 (or
0

) if successful and
FAIL

 (or
-1

) otherwise.

                                                                    Description VS Queryin terlace  retrieves the interlace mode of the vdata identified by the

                                                                                                                        parameter vdata_id  into the parameter interlace_mode .

                                                                                                                        Valid values for interlace_mode  are
FULL_INTERLACE

 (or
0

) and
NO_INTERLACE

                                                                                                                        (or
1

).

                                                                    FORTRAN integer function vsqfintr(vdata_id, interlace_mode)

                                                                                                                        integer vdata_id, interlace_mode

 VSQueryname/vsqfname

National Center for Supercomputing Applications

2-222 June 26, 1998

                                                  VSQueryname/vsqfname

                                                  intn VSQueryname(int32 vdata_id , char * vdata_name )

                                                                  vdata_id IN: Vdata identifier returned by VSattach

                                                                  vdata_name OUT: Name of the vdata

                                                                  Pu rpose Retrieves the name of a vdata.

                                                                  Retu rn value Returns
SUCCEED

 (or
0

) if successful and
FAIL

 (or
-1

) otherwise.

                                                                  Description VS Queryname  retrieves the name of the vdata identified by the parameter

                                                                                                                       vdata_id  into the buffer vdata_name .

                                                                  FORTRAN integer function vsqfname(vdata_id, vdata_name)

                                                                                                                       integer vdata_id

                                                                                                                       character*(*) vdata_name

VSQueryref/vsqref

                                                                    June 26, 1998 2-223

H DF Reference Manual

                                                   VSQueryref/vsqref

                                                   int32 VSQueryref(int32 vdata_id )

                                                                    vdata_id IN: Vdata identifier returned by VSattach

                                                                    Pu rpose Returns the reference number of a vdata.

                                                                    Retu rn value Returns the reference number of the vdata if successful and
FAIL

 (or
-1

)

                                                                                                                        otherwise.

                                                                    Description VS Queryref  returns the reference number of the vdata identified by the

                                                                                                                        parameter vdata_id .

                                                                    FORTRAN integer function vsqref(vdata_id)

                                                                                                                        integer vdata_id

 VSQuerytag/vsqtag

National Center for Supercomputing Applications

2-224 June 26, 1998

                                                  VSQuerytag/vsqtag

                                                  int32 VSQuerytag(int32 vdata_id )

                                                                  vdata_id IN: Vdata identifier returned by VSattach

                                                                  Pu rpose Returns the tag of the specified vdata.

                                                                  Retu rn value Returns the tag of the vdata if successful and
FAIL

 (or
-1

) otherwise.

                                                                  Description Returns the tag of the vdata identified by the parameter vdata_id .

                                                                  FORTRAN integer function vsqtag(vdata_id)

                                                                                                                       integer vdata_id

VSQueryvsize/vsqfvsiz

                                                                    June 26, 1998 2-225

H DF Reference Manual

                                                   VSQueryvsize/vsqfvsiz

                                                   intn VSQueryvsize(int32 vdata_id , int32 * vdata_size )

                                                                    vdata_id IN: Vdata identifier returned by VSattach

                                                                    vdata_size OUT: Size of the vdata record

                                                                    Pu rpose Retrieves the size of a record in a vdata.

                                                                    Retu rn value Returns
SUCCEED

 (or
0

) if successful and
FAIL

 (or
-1

) otherwise.

                                                                    Description VS Queryvsize  retrieves the size, in bytes, of a record in the vdata identified by

                                                                                                                        the parameter vdata_id into the parameter vdata_size . The returned size value

                                                                                                                        is machine dependent.

                                                                    FORTRAN integer function vsqfvsiz(vdata_id, vdata_size)

                                                                                                                        integer vdata_id, vdata_size

National Center for Supercomputing Applications

2-226 June 26, 1998