 VFfieldesize/vffesiz

RM-322 May 14, 1997

                                                                  VFfieldesize/vffesiz

                                                                  int32 VFfieldesize(int32 vdata_id,  int32 field_index )

                                                                                        vdata_id IN: Vdata access identifier returned from VSattach

                                                                                        field_index IN: Number determined by assigning each field in the record a zero-

based number

                                                                                        Purpose Retrieves the size, as stored on disk, of the specified field in the specified

vdata.

                                                                                        Return value Returns the size of a value for the specified field if successful and
FAIL

 (or
-

1

) otherwise.

                                                                                        FORTRAN
integer function vffesiz(vdata_id, field_index)

integer vdata_id, field_index

VFfieldisize/vffisiz

                                                                    May 14, 1997 RM-323

National Center for Supercomputing Applications

                                                                    VFfieldisize/vffisiz

                                                                    int32 VFfieldisize(int32 vdata_id , int32 field_index )

                                                                                         vdata_id IN: Vdata access identifier returned from VSattach

                                                                                         field_index IN: Number determined by assigning each field in the record a zero-

based index starting with
0

                                                                                         Purpose Retrieves the size, as stored in memory, of the specified field in a given vdata.

                                                                                         Return value Returns the size of a value for the specified field if successful and
FAIL

 (or
-

1

) otherwise.

                                                                                         FORTRAN
integer function vffisiz(vdata_id, field_index)

integer vdata_id, field_index

 VFfieldname/vffname

RM-324 May 14, 1997

                                                                  VFfieldname/vffname

                                                                  char *VFfieldname(int32 vdata_id , int32 field_index )

                                                                                        vdata_id IN: Vdata access identifier returned from VSattach

                                                                                        field_index IN: Number determined by assigning each field in the record a zero-

based index

                                                                                        Purpose Retrieves the fieldname for the specified field in a given vdata.

                                                                                        Return value Returns a pointer to the fieldname if successful and
NULL

 otherwise. The For-

tran-77 version of this routine,
vffname

, returns
SUCCEED

 (or
0

) or
FAIL

 (or
-

1

).

                                                                                        Description The Fortran-77 version of this routine,
vffname

, returns the field name in

the
fname

 parameter.

                                                                                        FORTRAN
integer function vffname(vdata_id, field_index, fname)

integer vdata_id, field_index

character* (*) fname

VFfieldorder/vffordr

                                                                    May 14, 1997 RM-325

National Center for Supercomputing Applications

                                                                    VFfieldorder/vffordr

                                                                    int32 VFfieldorder(int32 vdata_id , int32 field_index )

                                                                                         vdata_id IN: Vdata access identifier returned from VSattach

                                                                                         field_index IN: Number determined by assigning each field in the record a zero-

based index

                                                                                         Purpose Retrieves the order of the specified field in a given vdata.

                                                                                         Return value Returns the order of the field if successful and
FAIL

 (or
-1

) otherwise.

                                                                                         FORTRAN
integer function vffordr(vdata_id, field_index)

integer vdata_id, field_index

 VFfieldtype/vfftype

RM-326 May 14, 1997

                                                                  VFfieldtype/vfftype

                                                                  int32 VFfieldtype(int32 vdata_id , int32 field_index )

                                                                                        vdata_id IN: Vdata access identifier returned from VSattach

                                                                                        field_index IN: Number determined by assigning each field in the record a zero-

based index

                                                                                        Purpose Retrieves the data type for the specified field in a given vdata.

                                                                                        Return value Returns the data type if successful and
FAIL

 (or
-1

) otherwise.

                                                                                        FORTRAN
integer function vfftype(vdata_id, field_index)

integer vdata_id, field_index

VFnfields/vfnflds

                                                                    May 14, 1997 RM-327

National Center for Supercomputing Applications

                                                                    VFnfields/vfnflds

                                                                    int32 VFnfields(int32 vdata_id )

                                                                                         vdata_id IN: Vdata identifier returned by VSattach

                                                                                         Purpose Returns the total number of fields in the specified vdata.

                                                                                         Return value Returns
SUCCEED

 (or
0

) if successful and
FAIL

 (or
-1

) otherwise.

                                                                                         FORTRAN
integer function vfnflds(vdata_id)

integer vdata_id