                                                   May 14, 1997 R M-11

Section

                2

                                                            HDF Routine Reference

                                   2.1 Reference Section Overview

                                                   This section of the Reference Manual contains a listing of every routine contained in the HD F ver-

                                                   sion 4.1r1 library. The pages are organized alphabetically according to the C routine name. Each

                                                   page addresses one C routine, and the related Fortran-77 routines, and takes the following form:

                                                   Routin e_Name

                                                   return_type function_name(type parameter1 , type parameter2 )

                                                                        parameter1 Definition of the first parameter

                                                                        parameter2 Definition of the second parameter

                                                                        . . .

                                                                        parameterN Definition of the Nth parameter

                                                                        Purpose Section containing a short description of the routine.

                                                                        Return value Section describing the return value, if any, and error conditions.

                                                                        Description This optional section details any special circumstances surrounding the use

of the routine, identifies any routines that must precede it, and describes any

known complications related to the use of it.

                                                                        Example This optional section consists of one or more examples of the use of the rou-

tine. The examples are generally not complete programs are intended for

illustrative purposes only.  For complete programs, and further descriptions

of the routine,  refer to the HDF Userś Guide .

                                                                        FORTRAN This section provides a synopsis of the equivalent Fortran-77 routine or rou-

tines.

RM-12 May 14, 1997