DFKNTsize

                                                                    May 14, 1997 R M-67

National Center for Supercomputing Applications

                                                                    DFKNTsize

                                                                    int DF KNTsize(int32 data_type )

                                                                                         data_type IN: Data type

                                                                                         Purpose Determines the size of the specified data type.

                                                                                         Return value Returns the size, in bytes, of the specified data type if successful and
FAIL

 (or

-1

) otherwise.